Polarized duality forg1p_{STAT. PDF GRSV AAC}

RESONANCES WR GR WLO WHI

RES. INTEGRALS ERROR g1p 1 g1p 2 g1p 1 g1p 2 DELTA 1.212 0.191 1.112 1.313 -0.00152 0.0002 0.0063 0.0077 0.0077 0.0073 0.0073 R1350 1.347 0.058 1.313 1.393 0.0030 0.0001 0.0036 0.0040 0.0041 0.0037 0.0037 R2 1.54 0.257 1.393 1.675 0.0203 0.0002 0.0153 0.0163 0.0165 0.0150 0.0150 R3 1.732 0.101 1.675 1.789 0.0084 0.0001 0.0064 0.0069 0.0070 0.0063 0.0064 GLOBAL 1.080 1.910 0.0354 0.0003 0.0388 0.0431 0.0434 0.0400 0.0400

INTEGRAL RATIOSPDFS/RESONANCES

STAT. PDF GRSV AAC

g1p 1 g1p 2 g1p 1 g1p 2 AVERAGE ERROR 4.180 5.09 5.08 4.82 4.80 4.79 0.78 1.225 1.36 1.37 1.27 1.26 1.30 0.07 0.756 0.80 0.81 0.74 0.74 0.77 0.04 0.756 0.82 0.83 0.75 0.76 0.78 0.04 1.095 1.22 1.22 1.13 1.13 1.16 0.06

INTEGRAL RATIOSPDFS/RESONANCES VARIABLE = ξ

STAT. PDF GRSV AAC

g1p 1 g1p 1 AVERAGE ERROR 4.43 5.37 5.09 4.96 0.84 1.23 1.36 1.27 1.28 0.07 0.75 0.80 0.74 0.76 0.04 0.76 0.82 0.75 0.78 0.04 1.03 1.13 1.05 1.07 0.05

0.3 0.4 0.5 0.6 0.7 0.8 0.9

-0.05

0.00

0.05

0.10

0.15

0.20

0.25

RSS g1p soffer 1.279 GRSV g1p 1 GRSV g1p 2 AAC g1p 1 AAC g1p 2

x g1p