Polarized duality for g 1p_{stat. pdf GRSV AAC}

Resonances W_R G_R W_lo W_hi

Res. Integrals Error g1p 1 g1p 2 g1p 1 g1p 2 Delta 1.203 0.153 1.110 1.297 -0.00172 0.0002 0.0058 0.0072 0.0071 0.0068 0.0068 R1350 1.346 0.065 1.297 1.391 0.0033 0.0001 0.0042 0.0047 0.0048 0.0044 0.0044 R2 1.544 0.281 1.391 1.677 0.0205 0.0002 0.0156 0.0166 0.0168 0.0153 0.0153 R3 1.734 0.129 1.677 1.791 0.0081 0.0001 0.0064 0.0069 0.0069 0.0063 0.0064 Global 1.085 1.910 0.0347 0.0003 0.0385 0.0427 0.0431 0.0397 0.0397

Integral ratios PDFS/Resonances stat. pdf GRSV AAC

g1p 1 g1p 2 g1p 1 g1p 2 Average error 3.401 4.17 4.16 3.96 3.94 3.93 0.27 1.298 1.44 1.46 1.35 1.34 1.38 0.09 0.762 0.81 0.82 0.75 0.75 0.78 0.05 0.781 0.85 0.85 0.78 0.78 0.81 0.06 1.111 1.23 1.24 1.14 1.14 1.17 0.08

Integral ratios PDFS/Resonances

Variable = ξ stat. pdf GRSV AAC

g1p 1 g1p 1 Average error 3.46 4.23 4.02 3.90 0.27 1.30 1.44 1.35 1.36 0.09 0.76 0.81 0.74 0.77 0.05 0.78 0.85 0.78 0.80 0.05 1.05 1.16 1.07 1.09 0.07

0.3 0.4 0.5 0.6 0.7 0.8 0.9

-0.05

0.00

0.05

0.10

0.15

0.20

0.25

RSS g1p soffer 1.279 GRSV g1p 1 GRSV g1p 2 AAC g1p 1 AAC g1p 2

x g1p