Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E1 0 5 10 15 20

1650 1950 2250 signal-to-noise-E1 0 2.5 5 7.5 10

1650 1950 2250 response-E2 0 5 10 15 20

1650 1950 2250 signal-to-noise-E2

0 2.5 5 7.5 10

1650 1950 2250 response-E3 0 5 10 15 20

1650 1950 2250 signal-to-noise-E3 0 2.5 5 7.5 10

1650 1950 2250 response-E4 0 5 10 15 20

1650 1950 2250 signal-to-noise-E4

0 2.5 5 7.5 10

1650 1950 2250 response-E5 0 5 10 15 20

1650 1950 2250 signal-to-noise-E5 0 2.5 5 7.5 10

1650 1950 2250 response-E6 0 5 10 15 20

1650 1950 2250 signal-to-noise-E6

0 2.5 5 7.5 10

1650 1950 2250 response-E7 0 5 10 15 20

1650 1950 2250 signal-to-noise-E7 0 2.5 5 7.5 10

1650 1950 2250 response-E8 0 5 10 15 20

1650 1950 2250 signal-to-noise-E8

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E9 0 5 10 15 20

1650 1950 2250 signal-to-noise-E9 0 2.5 5 7.5 10

1650 1950 2250 response-E10 0 5 10 15 20

1650 1950 2250 signal-to-noise-E10

0 2.5 5 7.5 10

1650 1950 2250 response-E11 0 5 10 15 20

1650 1950 2250 signal-to-noise-E11 0 2.5 5 7.5 10

1650 1950 2250 response-E12 0 5 10 15 20

1650 1950 2250 signal-to-noise-E12

0 2.5 5 7.5 10

1650 1950 2250 response-E13 0 5 10 15 20

1650 1950 2250 signal-to-noise-E13 0 2.5 5 7.5 10

1650 1950 2250 response-E14 0 5 10 15 20

1650 1950 2250 signal-to-noise-E14

0 2.5 5 7.5 10

1650 1950 2250 response-E15 0 5 10 15 20

1650 1950 2250 signal-to-noise-E15 0 2.5 5 7.5 10

1650 1950 2250 response-E16 0 5 10 15 20

1650 1950 2250 signal-to-noise-E16

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E17 0 5 10 15 20

1650 1950 2250 signal-to-noise-E17 0 2.5 5 7.5 10

1650 1950 2250 response-E18 0 5 10 15 20

1650 1950 2250 signal-to-noise-E18

0 2.5 5 7.5 10

1650 1950 2250 response-E19 0 5 10 15 20

1650 1950 2250 signal-to-noise-E19 0 2.5 5 7.5 10

1650 1950 2250 response-E20 0 5 10 15 20

1650 1950 2250 signal-to-noise-E20

0 2.5 5 7.5 10

1650 1950 2250 response-E21 0 5 10 15 20

1650 1950 2250 signal-to-noise-E21 0 2.5 5 7.5 10

1650 1950 2250 response-E22 0 5 10 15 20

1650 1950 2250 signal-to-noise-E22

0 2.5 5 7.5 10

1650 1950 2250 response-E23 0 5 10 15 20

1650 1950 2250 signal-to-noise-E23 0 2.5 5 7.5 10

1650 1950 2250 response-E24 0 5 10 15 20

1650 1950 2250 signal-to-noise-E24

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E25 0 5 10 15 20

1650 1950 2250 signal-to-noise-E25 0 2.5 5 7.5 10

1650 1950 2250 response-E26 0 5 10 15 20

1650 1950 2250 signal-to-noise-E26

0 2.5 5 7.5 10

1650 1950 2250 response-E27 0 5 10 15 20

1650 1950 2250 signal-to-noise-E27 0 2.5 5 7.5 10

1650 1950 2250 response-E28 0 5 10 15 20

1650 1950 2250 signal-to-noise-E28

0 2.5 5 7.5 10

1650 1950 2250 response-E29 0 5 10 15 20

1650 1950 2250 signal-to-noise-E29 0 2.5 5 7.5 10

1650 1950 2250 response-E30 0 5 10 15 20

1650 1950 2250 signal-to-noise-E30

0 2.5 5 7.5 10

1650 1950 2250 response-E31 0 5 10 15 20

1650 1950 2250 signal-to-noise-E31 0 2.5 5 7.5 10

1650 1950 2250 response-E32 0 5 10 15 20

1650 1950 2250 signal-to-noise-E32

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E33 0 5 10 15 20

1650 1950 2250 signal-to-noise-E33 0 2.5 5 7.5 10

1650 1950 2250 response-E34 0 5 10 15 20

1650 1950 2250 signal-to-noise-E34

0 2.5 5 7.5 10

1650 1950 2250 response-E35 0 5 10 15 20

1650 1950 2250 signal-to-noise-E35 0 2.5 5 7.5 10

1650 1950 2250 response-E36 0 5 10 15 20

1650 1950 2250 signal-to-noise-E36

0 2.5 5 7.5 10

1650 1950 2250 response-E37 0 5 10 15 20

1650 1950 2250 signal-to-noise-E37 0 2.5 5 7.5 10

1650 1950 2250 response-E38 0 5 10 15 20

1650 1950 2250 signal-to-noise-E38

0 2.5 5 7.5 10

1650 1950 2250 response-E39 0 5 10 15 20

1650 1950 2250 signal-to-noise-E39 0 2.5 5 7.5 10

1650 1950 2250 response-E40 0 5 10 15 20

1650 1950 2250 signal-to-noise-E40

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E41 0 5 10 15 20

1650 1950 2250 signal-to-noise-E41 0 2.5 5 7.5 10

1650 1950 2250 response-E42 0 5 10 15 20

1650 1950 2250 signal-to-noise-E42

0 2.5 5 7.5 10

1650 1950 2250 response-E43 0 5 10 15 20

1650 1950 2250 signal-to-noise-E43 0 2.5 5 7.5 10

1650 1950 2250 response-E44 0 5 10 15 20

1650 1950 2250 signal-to-noise-E44

0 2.5 5 7.5 10

1650 1950 2250 response-E45 0 5 10 15 20

1650 1950 2250 signal-to-noise-E45 0 2.5 5 7.5 10

1650 1950 2250 response-E46 0 5 10 15 20

1650 1950 2250 signal-to-noise-E46

0 2.5 5 7.5 10

1650 1950 2250 response-E47 0 5 10 15 20

1650 1950 2250 signal-to-noise-E47 0 2.5 5 7.5 10

1650 1950 2250 response-E48 0 5 10 15 20

1650 1950 2250 signal-to-noise-E48

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E97 0 5 10 15 20

1650 1950 2250 signal-to-noise-E97 0 2.5 5 7.5 10

1650 1950 2250 response-E98 0 5 10 15 20

1650 1950 2250 signal-to-noise-E98

0 2.5 5 7.5 10

1650 1950 2250 response-E99 0 5 10 15 20

1650 1950 2250 signal-to-noise-E99 0 2.5 5 7.5 10

1650 1950 2250 response-E100 0 5 10 15 20

1650 1950 2250 signal-to-noise-E100

0 2.5 5 7.5 10

1650 1950 2250 response-E101 0 5 10 15 20

1650 1950 2250 signal-to-noise-E101 0 2.5 5 7.5 10

1650 1950 2250 response-E102 0 5 10 15 20

1650 1950 2250 signal-to-noise-E102

0 2.5 5 7.5 10

1650 1950 2250 response-E103 0 5 10 15 20

1650 1950 2250 signal-to-noise-E103 0 2.5 5 7.5 10

1650 1950 2250 response-E104 0 5 10 15 20

1650 1950 2250 signal-to-noise-E104

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E105 0 5 10 15 20

1650 1950 2250 signal-to-noise-E105 0 2.5 5 7.5 10

1650 1950 2250 response-E106 0 5 10 15 20

1650 1950 2250 signal-to-noise-E106

0 2.5 5 7.5 10

1650 1950 2250 response-E107 0 5 10 15 20

1650 1950 2250 signal-to-noise-E107 0 2.5 5 7.5 10

1650 1950 2250 response-E108 0 5 10 15 20

1650 1950 2250 signal-to-noise-E108

0 2.5 5 7.5 10

1650 1950 2250 response-E109 0 5 10 15 20

1650 1950 2250 signal-to-noise-E109 0 2.5 5 7.5 10

1650 1950 2250 response-E110 0 5 10 15 20

1650 1950 2250 signal-to-noise-E110

0 2.5 5 7.5 10

1650 1950 2250 response-E111 0 5 10 15 20

1650 1950 2250 signal-to-noise-E111 0 2.5 5 7.5 10

1650 1950 2250 response-E112 0 5 10 15 20

1650 1950 2250 signal-to-noise-E112

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E113 0 5 10 15 20

1650 1950 2250 signal-to-noise-E113 0 2.5 5 7.5 10

1650 1950 2250 response-E114 0 5 10 15 20

1650 1950 2250 signal-to-noise-E114

0 2.5 5 7.5 10

1650 1950 2250 response-E115 0 5 10 15 20

1650 1950 2250 signal-to-noise-E115 0 2.5 5 7.5 10

1650 1950 2250 response-E116 0 5 10 15 20

1650 1950 2250 signal-to-noise-E116

0 2.5 5 7.5 10

1650 1950 2250 response-E117 0 5 10 15 20

1650 1950 2250 signal-to-noise-E117 0 2.5 5 7.5 10

1650 1950 2250 response-E118 0 5 10 15 20

1650 1950 2250 signal-to-noise-E118

0 2.5 5 7.5 10

1650 1950 2250 response-E119 0 5 10 15 20

1650 1950 2250 signal-to-noise-E119 0 2.5 5 7.5 10

1650 1950 2250 response-E120 0 5 10 15 20

1650 1950 2250 signal-to-noise-E120

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E121 0 5 10 15 20

1650 1950 2250 signal-to-noise-E121 0 2.5 5 7.5 10

1650 1950 2250 response-E122 0 5 10 15 20

1650 1950 2250 signal-to-noise-E122

0 2.5 5 7.5 10

1650 1950 2250 response-E123 0 5 10 15 20

1650 1950 2250 signal-to-noise-E123 0 2.5 5 7.5 10

1650 1950 2250 response-E124 0 5 10 15 20

1650 1950 2250 signal-to-noise-E124

0 2.5 5 7.5 10

1650 1950 2250 response-E125 0 5 10 15 20

1650 1950 2250 signal-to-noise-E125 0 2.5 5 7.5 10

1650 1950 2250 response-E126 0 5 10 15 20

1650 1950 2250 signal-to-noise-E126

0 2.5 5 7.5 10

1650 1950 2250 response-E127 0 5 10 15 20

1650 1950 2250 signal-to-noise-E127 0 2.5 5 7.5 10

1650 1950 2250 response-E128 0 5 10 15 20

1650 1950 2250 signal-to-noise-E128

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E129 0 5 10 15 20

1650 1950 2250 signal-to-noise-E129 0 2.5 5 7.5 10

1650 1950 2250 response-E130 0 5 10 15 20

1650 1950 2250 signal-to-noise-E130

0 2.5 5 7.5 10

1650 1950 2250 response-E131 0 5 10 15 20

1650 1950 2250 signal-to-noise-E131 0 2.5 5 7.5 10

1650 1950 2250 response-E132 0 5 10 15 20

1650 1950 2250 signal-to-noise-E132

0 2.5 5 7.5 10

1650 1950 2250 response-E133 0 5 10 15 20

1650 1950 2250 signal-to-noise-E133 0 2.5 5 7.5 10

1650 1950 2250 response-E134 0 5 10 15 20

1650 1950 2250 signal-to-noise-E134

0 2.5 5 7.5 10

1650 1950 2250 response-E135 0 5 10 15 20

1650 1950 2250 signal-to-noise-E135 0 2.5 5 7.5 10

1650 1950 2250 response-E136 0 5 10 15 20

1650 1950 2250 signal-to-noise-E136

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E137 0 5 10 15 20

1650 1950 2250 signal-to-noise-E137 0 2.5 5 7.5 10

1650 1950 2250 response-E138 0 5 10 15 20

1650 1950 2250 signal-to-noise-E138

0 2.5 5 7.5 10

1650 1950 2250 response-E139 0 5 10 15 20

1650 1950 2250 signal-to-noise-E139 0 2.5 5 7.5 10

1650 1950 2250 response-E140 0 5 10 15 20

1650 1950 2250 signal-to-noise-E140

0 2.5 5 7.5 10

1650 1950 2250 response-E141 0 5 10 15 20

1650 1950 2250 signal-to-noise-E141 0 2.5 5 7.5 10

1650 1950 2250 response-E142 0 5 10 15 20

1650 1950 2250 signal-to-noise-E142

0 2.5 5 7.5 10

1650 1950 2250 response-E143 0 5 10 15 20

1650 1950 2250 signal-to-noise-E143 0 2.5 5 7.5 10

1650 1950 2250 response-E144 0 5 10 15 20

1650 1950 2250 signal-to-noise-E144

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E145 0 5 10 15 20

1650 1950 2250 signal-to-noise-E145 0 2.5 5 7.5 10

1650 1950 2250 response-E146 0 5 10 15 20

1650 1950 2250 signal-to-noise-E146

0 2.5 5 7.5 10

1650 1950 2250 response-E147 0 5 10 15 20

1650 1950 2250 signal-to-noise-E147 0 2.5 5 7.5 10

1650 1950 2250 response-E148 0 5 10 15 20

1650 1950 2250 signal-to-noise-E148

0 2.5 5 7.5 10

1650 1950 2250 response-E149 0 5 10 15 20

1650 1950 2250 signal-to-noise-E149 0 2.5 5 7.5 10

1650 1950 2250 response-E150 0 5 10 15 20

1650 1950 2250 signal-to-noise-E150

0 2.5 5 7.5 10

1650 1950 2250 response-E151 0 5 10 15 20

1650 1950 2250 signal-to-noise-E151 0 2.5 5 7.5 10

1650 1950 2250 response-E152 0 5 10 15 20

1650 1950 2250 signal-to-noise-E152

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E153 0 5 10 15 20

1650 1950 2250 signal-to-noise-E153 0 2.5 5 7.5 10

1650 1950 2250 response-E154 0 5 10 15 20

1650 1950 2250 signal-to-noise-E154

0 2.5 5 7.5 10

1650 1950 2250 response-E155 0 5 10 15 20

1650 1950 2250 signal-to-noise-E155 0 2.5 5 7.5 10

1650 1950 2250 response-E156 0 5 10 15 20

1650 1950 2250 signal-to-noise-E156

0 2.5 5 7.5 10

1650 1950 2250 response-E157 0 5 10 15 20

1650 1950 2250 signal-to-noise-E157 0 2.5 5 7.5 10

1650 1950 2250 response-E158 0 5 10 15 20

1650 1950 2250 signal-to-noise-E158

0 2.5 5 7.5 10

1650 1950 2250 response-E159 0 5 10 15 20

1650 1950 2250 signal-to-noise-E159 0 2.5 5 7.5 10

1650 1950 2250 response-E160 0 5 10 15 20

1650 1950 2250 signal-to-noise-E160

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E161 0 5 10 15 20

1650 1950 2250 signal-to-noise-E161 0 2.5 5 7.5 10

1650 1950 2250 response-E162 0 5 10 15 20

1650 1950 2250 signal-to-noise-E162

0 2.5 5 7.5 10

1650 1950 2250 response-E163 0 5 10 15 20

1650 1950 2250 signal-to-noise-E163 0 2.5 5 7.5 10

1650 1950 2250 response-E164 0 5 10 15 20

1650 1950 2250 signal-to-noise-E164

0 2.5 5 7.5 10

1650 1950 2250 response-E165 0 5 10 15 20

1650 1950 2250 signal-to-noise-E165 0 2.5 5 7.5 10

1650 1950 2250 response-E166 0 5 10 15 20

1650 1950 2250 signal-to-noise-E166

0 2.5 5 7.5 10

1650 1950 2250 response-E167 0 5 10 15 20

1650 1950 2250 signal-to-noise-E167 0 2.5 5 7.5 10

1650 1950 2250 response-E168 0 5 10 15 20

1650 1950 2250 signal-to-noise-E168

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E169 0 5 10 15 20

1650 1950 2250 signal-to-noise-E169 0 2.5 5 7.5 10

1650 1950 2250 response-E170 0 5 10 15 20

1650 1950 2250 signal-to-noise-E170

0 2.5 5 7.5 10

1650 1950 2250 response-E171 0 5 10 15 20

1650 1950 2250 signal-to-noise-E171 0 2.5 5 7.5 10

1650 1950 2250 response-E172 0 5 10 15 20

1650 1950 2250 signal-to-noise-E172

0 2.5 5 7.5 10

1650 1950 2250 response-E173 0 5 10 15 20

1650 1950 2250 signal-to-noise-E173 0 2.5 5 7.5 10

1650 1950 2250 response-E174 0 5 10 15 20

1650 1950 2250 signal-to-noise-E174

0 2.5 5 7.5 10

1650 1950 2250 response-E175 0 5 10 15 20

1650 1950 2250 signal-to-noise-E175 0 2.5 5 7.5 10

1650 1950 2250 response-E176 0 5 10 15 20

1650 1950 2250 signal-to-noise-E176

Determination of E-counter Plateaux

0 2.5 5 7.5 10

1650 1950 2250 response-E177 0 5 10 15 20

1650 1950 2250 signal-to-noise-E177 0 2.5 5 7.5 10

1650 1950 2250 response-E178 0 5 10 15 20

1650 1950 2250 signal-to-noise-E178

0 2.5 5 7.5 10

1650 1950 2250 response-E179 0 5 10 15 20

1650 1950 2250 signal-to-noise-E179 0 2.5 5 7.5 10

1650 1950 2250 response-E180 0 5 10 15 20

1650 1950 2250 signal-to-noise-E180

0 5 10 15

1650 1950 2250 response-E181 0 5 10 15

1650 1950 2250 signal-to-noise-E181 0 5 10 15

1650 1950 2250 response-E182 0 5 10 15

1650 1950 2250 signal-to-noise-E182

0 5 10 15

1650 1950 2250 response-E183 0 5 10 15

1650 1950 2250 signal-to-noise-E183 0 5 10 15

1650 1950 2250 response-E184 0 5 10 15

1650 1950 2250 signal-to-noise-E184

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E185 0 5 10 15

1650 1950 2250 signal-to-noise-E185 0 5 10 15

1650 1950 2250 response-E186 0 5 10 15

1650 1950 2250 signal-to-noise-E186

0 5 10 15

1650 1950 2250 response-E187 0 5 10 15

1650 1950 2250 signal-to-noise-E187 0 5 10 15

1650 1950 2250 response-E188 0 5 10 15

1650 1950 2250 signal-to-noise-E188

0 5 10 15

1650 1950 2250 response-E189 0 5 10 15

1650 1950 2250 signal-to-noise-E189 0 5 10 15

1650 1950 2250 response-E190 0 5 10 15

1650 1950 2250 signal-to-noise-E190

0 5 10 15

1650 1950 2250 response-E191 0 5 10 15

1650 1950 2250 signal-to-noise-E191 0 5 10 15

1650 1950 2250 response-E192 0 5 10 15

1650 1950 2250 signal-to-noise-E192

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E193 0 5 10 15

1650 1950 2250 signal-to-noise-E193 0 5 10 15

1650 1950 2250 response-E194 0 5 10 15

1650 1950 2250 signal-to-noise-E194

0 5 10 15

1650 1950 2250 response-E195 0 5 10 15

1650 1950 2250 signal-to-noise-E195 0 5 10 15

1650 1950 2250 response-E196 0 5 10 15

1650 1950 2250 signal-to-noise-E196

0 5 10 15

1650 1950 2250 response-E197 0 5 10 15

1650 1950 2250 signal-to-noise-E197 0 5 10 15

1650 1950 2250 response-E198 0 5 10 15

1650 1950 2250 signal-to-noise-E198

0 5 10 15

1650 1950 2250 response-E199 0 5 10 15

1650 1950 2250 signal-to-noise-E199 0 5 10 15

1650 1950 2250 response-E200 0 5 10 15

1650 1950 2250 signal-to-noise-E200

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E201 0 5 10 15

1650 1950 2250 signal-to-noise-E201 0 5 10 15

1650 1950 2250 response-E202 0 5 10 15

1650 1950 2250 signal-to-noise-E202

0 5 10 15

1650 1950 2250 response-E203 0 5 10 15

1650 1950 2250 signal-to-noise-E203 0 5 10 15

1650 1950 2250 response-E204 0 5 10 15

1650 1950 2250 signal-to-noise-E204

0 5 10 15

1650 1950 2250 response-E205 0 5 10 15

1650 1950 2250 signal-to-noise-E205 0 5 10 15

1650 1950 2250 response-E206 0 5 10 15

1650 1950 2250 signal-to-noise-E206

0 5 10 15

1650 1950 2250 response-E207 0 5 10 15

1650 1950 2250 signal-to-noise-E207 0 5 10 15

1650 1950 2250 response-E208 0 5 10 15

1650 1950 2250 signal-to-noise-E208

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E209 0 5 10 15

1650 1950 2250 signal-to-noise-E209 0 5 10 15

1650 1950 2250 response-E210 0 5 10 15

1650 1950 2250 signal-to-noise-E210

0 5 10 15

1650 1950 2250 response-E211 0 5 10 15

1650 1950 2250 signal-to-noise-E211 0 5 10 15

1650 1950 2250 response-E212 0 5 10 15

1650 1950 2250 signal-to-noise-E212

0 5 10 15

1650 1950 2250 response-E213 0 5 10 15

1650 1950 2250 signal-to-noise-E213 0 5 10 15

1650 1950 2250 response-E214 0 5 10 15

1650 1950 2250 signal-to-noise-E214

0 5 10 15

1650 1950 2250 response-E215 0 5 10 15

1650 1950 2250 signal-to-noise-E215 0 5 10 15

1650 1950 2250 response-E216 0 5 10 15

1650 1950 2250 signal-to-noise-E216

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E217 0 5 10 15

1650 1950 2250 signal-to-noise-E217 0 5 10 15

1650 1950 2250 response-E218 0 5 10 15

1650 1950 2250 signal-to-noise-E218

0 5 10 15

1650 1950 2250 response-E219 0 5 10 15

1650 1950 2250 signal-to-noise-E219 0 5 10 15

1650 1950 2250 response-E220 0 5 10 15

1650 1950 2250 signal-to-noise-E220

0 5 10 15

1650 1950 2250 response-E221 0 5 10 15

1650 1950 2250 signal-to-noise-E221 0 5 10 15

1650 1950 2250 response-E222 0 5 10 15

1650 1950 2250 signal-to-noise-E222

0 5 10 15

1650 1950 2250 response-E223 0 5 10 15

1650 1950 2250 signal-to-noise-E223 0 5 10 15

1650 1950 2250 response-E224 0 5 10 15

1650 1950 2250 signal-to-noise-E224

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E225 0 5 10 15

1650 1950 2250 signal-to-noise-E225 0 5 10 15

1650 1950 2250 response-E226 0 5 10 15

1650 1950 2250 signal-to-noise-E226

0 5 10 15

1650 1950 2250 response-E227 0 5 10 15

1650 1950 2250 signal-to-noise-E227 0 5 10 15

1650 1950 2250 response-E228 0 5 10 15

1650 1950 2250 signal-to-noise-E228

0 5 10 15

1650 1950 2250 response-E229 0 5 10 15

1650 1950 2250 signal-to-noise-E229 0 5 10 15

1650 1950 2250 response-E230 0 5 10 15

1650 1950 2250 signal-to-noise-E230

0 5 10 15

1650 1950 2250 response-E231 0 5 10 15

1650 1950 2250 signal-to-noise-E231 0 5 10 15

1650 1950 2250 response-E232 0 5 10 15

1650 1950 2250 signal-to-noise-E232

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E233 0 5 10 15

1650 1950 2250 signal-to-noise-E233 0 5 10 15

1650 1950 2250 response-E234 0 5 10 15

1650 1950 2250 signal-to-noise-E234

0 5 10 15

1650 1950 2250 response-E235 0 5 10 15

1650 1950 2250 signal-to-noise-E235 0 5 10 15

1650 1950 2250 response-E236 0 5 10 15

1650 1950 2250 signal-to-noise-E236

0 5 10 15

1650 1950 2250 response-E237 0 5 10 15

1650 1950 2250 signal-to-noise-E237 0 5 10 15

1650 1950 2250 response-E238 0 5 10 15

1650 1950 2250 signal-to-noise-E238

0 5 10 15

1650 1950 2250 response-E239 0 5 10 15

1650 1950 2250 signal-to-noise-E239 0 5 10 15

1650 1950 2250 response-E240 0 5 10 15

1650 1950 2250 signal-to-noise-E240

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E241 0 5 10 15

1650 1950 2250 signal-to-noise-E241 0 5 10 15

1650 1950 2250 response-E242 0 5 10 15

1650 1950 2250 signal-to-noise-E242

0 5 10 15

1650 1950 2250 response-E243 0 5 10 15

1650 1950 2250 signal-to-noise-E243 0 5 10 15

1650 1950 2250 response-E244 0 5 10 15

1650 1950 2250 signal-to-noise-E244

0 5 10 15

1650 1950 2250 response-E245 0 5 10 15

1650 1950 2250 signal-to-noise-E245 0 5 10 15

1650 1950 2250 response-E246 0 5 10 15

1650 1950 2250 signal-to-noise-E246

0 5 10 15

1650 1950 2250 response-E247 0 5 10 15

1650 1950 2250 signal-to-noise-E247 0 5 10 15

1650 1950 2250 response-E248 0 5 10 15

1650 1950 2250 signal-to-noise-E248

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E249 0 5 10 15

1650 1950 2250 signal-to-noise-E249 0 5 10 15

1650 1950 2250 response-E250 0 5 10 15

1650 1950 2250 signal-to-noise-E250

0 5 10 15

1650 1950 2250 response-E251 0 5 10 15

1650 1950 2250 signal-to-noise-E251 0 5 10 15

1650 1950 2250 response-E252 0 5 10 15

1650 1950 2250 signal-to-noise-E252

0 5 10 15

1650 1950 2250 response-E253 0 5 10 15

1650 1950 2250 signal-to-noise-E253 0 5 10 15

1650 1950 2250 response-E254 0 5 10 15

1650 1950 2250 signal-to-noise-E254

0 5 10 15

1650 1950 2250 response-E255 0 5 10 15

1650 1950 2250 signal-to-noise-E255 0 5 10 15

1650 1950 2250 response-E256 0 5 10 15

1650 1950 2250 signal-to-noise-E256

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E257 0 5 10 15

1650 1950 2250 signal-to-noise-E257 0 5 10 15

1650 1950 2250 response-E258 0 5 10 15

1650 1950 2250 signal-to-noise-E258

0 5 10 15

1650 1950 2250 response-E259 0 5 10 15

1650 1950 2250 signal-to-noise-E259 0 5 10 15

1650 1950 2250 response-E260 0 5 10 15

1650 1950 2250 signal-to-noise-E260

0 5 10 15

1650 1950 2250 response-E261 0 5 10 15

1650 1950 2250 signal-to-noise-E261 0 5 10 15

1650 1950 2250 response-E262 0 5 10 15

1650 1950 2250 signal-to-noise-E262

0 5 10 15

1650 1950 2250 response-E263 0 5 10 15

1650 1950 2250 signal-to-noise-E263 0 5 10 15

1650 1950 2250 response-E264 0 5 10 15

1650 1950 2250 signal-to-noise-E264

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E265 0 5 10 15

1650 1950 2250 signal-to-noise-E265 0 5 10 15

1650 1950 2250 response-E266 0 5 10 15

1650 1950 2250 signal-to-noise-E266

0 5 10 15

1650 1950 2250 response-E267 0 5 10 15

1650 1950 2250 signal-to-noise-E267 0 5 10 15

1650 1950 2250 response-E268 0 5 10 15

1650 1950 2250 signal-to-noise-E268

0 5 10 15

1650 1950 2250 response-E269 0 5 10 15

1650 1950 2250 signal-to-noise-E269 0 5 10 15

1650 1950 2250 response-E270 0 5 10 15

1650 1950 2250 signal-to-noise-E270

0 5 10 15

1650 1950 2250 response-E271 0 5 10 15

1650 1950 2250 signal-to-noise-E271 0 5 10 15

1650 1950 2250 response-E272 0 5 10 15

1650 1950 2250 signal-to-noise-E272

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E273 0 5 10 15

1650 1950 2250 signal-to-noise-E273 0 5 10 15

1650 1950 2250 response-E274 0 5 10 15

1650 1950 2250 signal-to-noise-E274

0 5 10 15

1650 1950 2250 response-E275 0 5 10 15

1650 1950 2250 signal-to-noise-E275 0 5 10 15

1650 1950 2250 response-E276 0 5 10 15

1650 1950 2250 signal-to-noise-E276

0 5 10 15

1650 1950 2250 response-E277 0 5 10 15

1650 1950 2250 signal-to-noise-E277 0 5 10 15

1650 1950 2250 response-E278 0 5 10 15

1650 1950 2250 signal-to-noise-E278

0 5 10 15

1650 1950 2250 response-E279 0 5 10 15

1650 1950 2250 signal-to-noise-E279 0 5 10 15

1650 1950 2250 response-E280 0 5 10 15

1650 1950 2250 signal-to-noise-E280

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E281 0 5 10 15

1650 1950 2250 signal-to-noise-E281 0 5 10 15

1650 1950 2250 response-E282 0 5 10 15

1650 1950 2250 signal-to-noise-E282

0 5 10 15

1650 1950 2250 response-E283 0 5 10 15

1650 1950 2250 signal-to-noise-E283 0 5 10 15

1650 1950 2250 response-E284 0 5 10 15

1650 1950 2250 signal-to-noise-E284

0 5 10 15

1650 1950 2250 response-E285 0 5 10 15

1650 1950 2250 signal-to-noise-E285 0 5 10 15

1650 1950 2250 response-E286 0 5 10 15

1650 1950 2250 signal-to-noise-E286

0 5 10 15

1650 1950 2250 response-E287 0 5 10 15

1650 1950 2250 signal-to-noise-E287 0 5 10 15

1650 1950 2250 response-E288 0 5 10 15

1650 1950 2250 signal-to-noise-E288

Determination of E-counter Plateaux

0 5 10 15

1650 1950 2250 response-E289 0 5 10 15

1650 1950 2250 signal-to-noise-E289 0 5 10 15

1650 1950 2250 response-E290 0 5 10 15

1650 1950 2250 signal-to-noise-E290

0 5 10 15

1650 1950 2250 response-E291 0 5 10 15

1650 1950 2250 signal-to-noise-E291 0 5 10 15

1650 1950 2250 response-E292 0 5 10 15

1650 1950 2250 signal-to-noise-E292

0 5 10 15

1650 1950 2250 response-E293 0 5 10 15

1650 1950 2250 signal-to-noise-E293 0 5 10 15

1650 1950 2250 response-E294 0 5 10 15

1650 1950 2250 signal-to-noise-E294

0 5 10 15

1650 1950 2250 response-E295 0 5 10 15

1650 1950 2250 signal-to-noise-E295 0 5 10 15

1650 1950 2250 response-E296 0 5 10 15

1650 1950 2250 signal-to-noise-E296

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E297 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E297 0 5 10 15 20

1650 1950 2250 response-E298 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E298

0 5 10 15 20

1650 1950 2250 response-E299 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E299 0 5 10 15 20

1650 1950 2250 response-E300 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E300

0 5 10 15 20

1650 1950 2250 response-E301 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E301 0 5 10 15 20

1650 1950 2250 response-E302 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E302

0 5 10 15 20

1650 1950 2250 response-E303 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E303 0 5 10 15 20

1650 1950 2250 response-E304 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E304

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E305 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E305 0 5 10 15 20

1650 1950 2250 response-E306 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E306

0 5 10 15 20

1650 1950 2250 response-E307 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E307 0 5 10 15 20

1650 1950 2250 response-E308 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E308

0 5 10 15 20

1650 1950 2250 response-E309 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E309 0 5 10 15 20

1650 1950 2250 response-E310 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E310

0 5 10 15 20

1650 1950 2250 response-E311 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E311 0 5 10 15 20

1650 1950 2250 response-E312 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E312

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E313 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E313 0 5 10 15 20

1650 1950 2250 response-E314 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E314

0 5 10 15 20

1650 1950 2250 response-E315 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E315 0 5 10 15 20

1650 1950 2250 response-E316 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E316

0 5 10 15 20

1650 1950 2250 response-E317 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E317 0 5 10 15 20

1650 1950 2250 response-E318 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E318

0 5 10 15 20

1650 1950 2250 response-E319 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E319 0 5 10 15 20

1650 1950 2250 response-E320 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E320

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E321 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E321 0 5 10 15 20

1650 1950 2250 response-E322 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E322

0 5 10 15 20

1650 1950 2250 response-E323 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E323 0 5 10 15 20

1650 1950 2250 response-E324 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E324

0 5 10 15 20

1650 1950 2250 response-E325 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E325 0 5 10 15 20

1650 1950 2250 response-E326 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E326

0 5 10 15 20

1650 1950 2250 response-E327 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E327 0 5 10 15 20

1650 1950 2250 response-E328 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E328

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E329 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E329 0 5 10 15 20

1650 1950 2250 response-E330 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E330

0 5 10 15 20

1650 1950 2250 response-E331 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E331 0 5 10 15 20

1650 1950 2250 response-E332 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E332

0 5 10 15 20

1650 1950 2250 response-E333 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E333 0 5 10 15 20

1650 1950 2250 response-E334 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E334

0 5 10 15 20

1650 1950 2250 response-E335 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E335 0 5 10 15 20

1650 1950 2250 response-E336 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E336

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E337 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E337 0 5 10 15 20

1650 1950 2250 response-E338 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E338

0 5 10 15 20

1650 1950 2250 response-E339 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E339 0 5 10 15 20

1650 1950 2250 response-E340 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E340

0 5 10 15 20

1650 1950 2250 response-E341 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E341 0 5 10 15 20

1650 1950 2250 response-E342 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E342

0 5 10 15 20

1650 1950 2250 response-E343 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E343 0 5 10 15 20

1650 1950 2250 response-E344 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E344

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E345 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E345 0 5 10 15 20

1650 1950 2250 response-E346 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E346

0 5 10 15 20

1650 1950 2250 response-E347 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E347 0 5 10 15 20

1650 1950 2250 response-E348 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E348

0 5 10 15 20

1650 1950 2250 response-E349 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E349 0 5 10 15 20

1650 1950 2250 response-E350 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E350

0 5 10 15 20

1650 1950 2250 response-E351 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E351 0 5 10 15 20

1650 1950 2250 response-E352 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E352

Determination of E-counter Plateaux

0 5 10 15 20

1650 1950 2250 response-E353 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E353 0 5 10 15 20

1650 1950 2250 response-E354 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E354

0 5 10 15 20

1650 1950 2250 response-E355 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E355 0 5 10 15 20

1650 1950 2250 response-E356 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E356

0 5 10 15 20

1650 1950 2250 response-E357 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E357 0 5 10 15 20

1650 1950 2250 response-E358 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E358

0 5 10 15 20

1650 1950 2250 response-E359 0 2.5 5 7.5 10

1650 1950 2250 signal-to-noise-E359 0 10 20 30

1650 1950 2250 response-E360 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E360

Determination of E-counter Plateaux

0 10 20 30

1650 1950 2250 response-E361 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E361 0 10 20 30

1650 1950 2250 response-E362 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E362

0 10 20 30

1650 1950 2250 response-E363 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E363 0 10 20 30

1650 1950 2250 response-E364 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E364

0 10 20 30

1650 1950 2250 response-E365 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E365 0 10 20 30

1650 1950 2250 response-E366 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E366

0 10 20 30

1650 1950 2250 response-E367 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E367 0 10 20 30

1650 1950 2250 response-E368 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E368

Determination of E-counter Plateaux

0 10 20 30

1650 1950 2250 response-E369 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E369 0 10 20 30

1650 1950 2250 response-E370 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E370

0 10 20 30

1650 1950 2250 response-E371 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E371 0 10 20 30

1650 1950 2250 response-E372 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E372

0 10 20 30

1650 1950 2250 response-E373 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E373 0 10 20 30

1650 1950 2250 response-E374 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E374

0 10 20 30

1650 1950 2250 response-E375 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E375 0 10 20 30

1650 1950 2250 response-E376 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E376

Determination of E-counter Plateaux

0 10 20 30

1650 1950 2250 response-E377 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E377 0 10 20 30

1650 1950 2250 response-E378 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E378

0 10 20 30

1650 1950 2250 response-E379 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E379 0 10 20 30

1650 1950 2250 response-E380 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E380

0 10 20 30

1650 1950 2250 response-E381 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E381 0 10 20 30

1650 1950 2250 response-E382 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E382

0 10 20 30

1650 1950 2250 response-E383 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E383 0 10 20 30

1650 1950 2250 response-E384 0 2 4 6 8 10

1650 1950 2250 signal-to-noise-E384