0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

40 MeV / bin

0

10

20

30

40

50

h1_80 Nent = 1091

(pi+ pi+ pi-) mass, neutron and rho cut on 1st (pi+, pi-) h1_80

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

40 MeV / bin

0

20

40

60

80

100

120 h1_81 Nent = 2353

(pi+ pi+ pi-) mass, neutron and rho cut on 2nd (pi+, pi-) h1_81