0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

20 Gev / bin

0

500

1000

1500

2000

2500

h1_51 Nent = 116810

(π^+, π^+, π^-) missing mass^{h1_51}_{Nent = 116810}

neutron