0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

20 MeV / bin

0

100

200

300

400

500

600

700

h1_70 Nent = 19980

(1^{st} π^+, π^-) mass (neutron detected)_{h1_70}

ρ^0 peak

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

20 MeV / bin

0 100 200 300 400 500 600 700 800 900 h1_71 Nent = 19980

(2^{nd} π^+, π^-) mass (neutron detected)_{h1_71}

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

20 MeV / bin

0 20 40 60 80 100 120 140 160 180 200 220 h1_72 Nent = 7840

(1^{st} π^+, π^-) mass (neutron cut)_{h1_72}

ρ^0 peak f^2 peak

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

20 MeV / bin

0

50

100

150

200

250

300 h1_73 Nent = 7840

(2^{nd} π^+, π^-) mass (neutron cut)_{h1_73}

ρ^0 peak