0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 0 200 400 600 800 1000

1200

1400

1600

1800

h1_76 Nent = 55640 any (pi+, pi-) mass, (neutron cut) h1_76

1st (pi+ , pi-) pair

2nd (pi+, pi-) pair