2 GeV/c

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

Events / 40 MeV

0

500

1000

1500

2000

2500

3000

3500

h_m3pi Nent = 63450

-cut ρ with

)^0π ^-π ^+πM(