-1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

Events / 40 MeV

0

5000

10000

15000

20000

25000

30000

35000_{h_mm2ppippim}

Nent = 515758 h_mm2ppippim

)^-π ^+π mm2 / (p

X^-π ^+π p → pγ