Samples [8ns]

0 200 400 600 800 1000 1200 1400 1600

ADC counts

10

210

Wires

Samples [8ns]

0 200 400 600 800 1000 1200 1400 1600

ADC counts

10

210

Down Strips

Samples [8ns]

0 200 400 600 800 1000 1200 1400 1600

ADC counts

210

310

410

510

Correlation Function