Excitation Curve

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 500 1000 1500 2000 2500 I (Amp)

B(Tesla)

Center-Line

0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

-100 -50 0 50 100 150 200 Position (cm)

B(Tesla)

Center-Line

0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

60 80 100 120 140 160 180 200 220 240 Position (cm)

B(Tesla)

-12.03cm (Left) Off-Center

0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

-100 -50 0 50 100 150 200 Position (cm)

B(Tesla)

-12.03cm (Left) Off-Center

0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

60 80 100 120 140 160 180 200 220 240 Position (cm)

B(Tesla)

+16.13cm (Right) Off-Center

0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

-100 -50 0 50 100 150 200 Position (cm)

B(Tesla)

+16.13cm (Right) Off-Center

0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

60 80 100 120 140 160 180 200 220 240 Position (cm)

B(Tesla)

All

0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

-100 -50 0 50 100 150 200 Position (cm)

B(Tesla)

All

0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

60 80 100 120 140 160 180 200 Position (cm)

B(Tesla)