z (m) x (m)

4 4.5 5 5.5 6 6.5 7 7.5 8

-7 -6 -5 -4 -3 -2 -1 0

Test SANE setup with 10000 electrons generated at 6 GeV

2007/01/28 07.57

CEBAF Hall C End Station Cut plane at y = 0 m