Summary for trkm19496.a00.hbook

Time residual sigmas, narrow (in microns)

Sec1 SL1 296.482 310.125 445.66 322.003 343.472 470.127

Sec2 SL2 425.303 317.895 339.032 322.935 330.13 525.3

Sec3

SL3 318.606 298.156 315.516 297.028 292.645 320.169

Sec4

SL4 297.253 288.746 310.719 292.203 273.615 343.363

Sec5

SL5 308.173 309.337 317.324 294.068 288.986 389.336

Sec6

SL6 328.666 337.938 353.982 312.515 338.435 324.319 avg. 329.08 310.367 347.038 306.793 311.215 395.437 avg. 364.645 376.767 307.02 300.983 317.872 332.645 333.323

Time residual sigmas, wide (in microns)

Sec1 SL1 665.174 878.331 1048.99 847.094 798.11 1011.02

Sec2 SL2 890.468 771.29 759.906 767.883 790.353 864.119

Sec3

SL3 770.876 763.235 808.195 778.382 760.024 774.833

Sec4

SL4 801.696 737.469 847.173 780.337 705.292 837.818

Sec5

SL5 821.266 829.754 837.979 829.805 830.063 890.304

Sec6

SL6 836.183 856.756 860.627 818.94 830.1 815.16 avg. 797.612 806.14 860.48 803.742 785.655 865.542 avg. 874.787 807.337 775.923 784.965 839.862 836.295 819.862

Time residual means (in microns)

Sec1 SL1 229.156 -20.0373 142.965 29.0825 -27.5498 418.314

Sec2 SL2 197.547 -83.4063 194.694 -156.259 134.255 643.108

Sec3

SL3 63.0853 39.4294 105.73 62.8305 53.8475 90.7201

Sec4

SL4 46.7918 -29.8407 107.747 9.35384 -112.928 69.2511

Sec5

SL5 50.6139 47.244 61.2356 49.4931 -36.0245 107.87

Sec6

SL6 42.6874 58.8914 20.4363 20.7977 25.003 -63.9465 avg. 104.98 2.04668 105.468 2.54968 6.10042 210.885 avg. 128.655 154.99 69.2738 15.0625 46.7387 17.3117 72.005

Hits per TBT

Sec1 SL1 3.34998 3.43428 3.65775 3.79882 3.76801 3.57323

Sec2 SL2 4.64393 5.38787 5.63605 5.60238 5.5659 3.49651

Sec3

SL3 5.38449 5.33912 5.5017 5.63221 5.59284 5.59444

Sec4

SL4 5.13367 5.31769 5.42051 5.45069 5.38813 5.25079

Sec5

SL5 5.34045 5.00925 5.2606 5.40808 5.44834 5.19165

Sec6

SL6 5.082 4.96655 5.07237 5.30704 5.06456 4.91392 avg. 28.9346 29.4549 30.549 31.1992 30.8278 28.0206 avg. 3.597 5.05545 5.50745 5.32692 5.2764 5.06773 29.8312

Avg. Chisq per DOF

Sec1 3.62564

Sec2 3.25597

Sec3 3.20497

Sec4 3.3493

Sec5 3.35872

Sec6 4.95732 avg. 3.62532