Hall C Steering Committee

Steering Committee Composition

The Hall C Steering Committee shall consist of four members. Each Member shall have a tenure of two calendar years. Each year two of the Members will be rotated. The Hall C Steering Committee shall elect one of its Members as a Chair.

Initial Steering Committee Members

The initial Hall C Steering Committee Members shall be those elected by the incorporator. After one year of tenure, two members shall be rotated.

Steering Committee Responsibilities

1. Give the Hall C User Community an effective channel of communication with the Hall C management for general Hall issues and improvements.

2. Represent the interests of the Hall C User Community in enhancing the visibility of Hall C physics at, e.g., conferences and workshops, and to the larger audience.

3. Organize a Workshop on topics directly related to the present or future Hall C physics program. This Hall C Workshop will occur annually between the period of April 1st and September 30th. The dates for, and physics topics of, this Workshop should be announced well in advance (at least two months) to the Hall C User Community.

4. Provide, at the request of Hall C management, specific input and feedback on topics of interest to Hall C and its user community.

5. Provide input and feedback to Hall C management for the annual Hall C Users Meeting, tentatively scheduled for the second week of January. This meeting shall discuss the progress in physics analysis, equipment understanding, and future plans of the Hall C physics program.

6. Annually elect two new members for the Hall C Steering Committee, in coordination with Hall C management, to be presented at the January Hall C User Meeting. Input for these new members shall be sollicited in a public manner from the Hall C User Community.

7. The tenure of each new member shall last for two years, starting from the January Hall C User Meeting in which their tenure started.

8. Elect one of its four members as the Chair of the Hall C Steering Committee, to be presented at the annual January Hall C User Meeting. The tenure of a Chair can either be one year or two years.