Proposal for PrimEx HV purchase

David Lawrence 12/4/00

It is proposed that the collaboration purchase the following items through WieNeR Plein & Baus Corp.:

Item Description Quantity Unit Price

Total Price

CAEN SY1527 Universal HV system "master" 2 $11,020 $22,040

CAEN SY1527S Universal HV system "slave" 2 $8,580 $17,160

CAEN A1932 48- channel HV distributor card 25 $3,600 $90,000

Total

Total $129,200$129,200

This includes 1 spare "master" crate and 1 spare 48- channel HV card. The price per channel is approximately $108.

This price does not include S & H and the order must be placed by December 15, 2000 in order to lock in these prices^¥.

¥ Placing the order after December 15^{th} will result in a total price increase of $20,755 (or approx. $125 per channel).