adcLMS_1171 Entries 18 Mean 957.8 RMS 20.3

LMS (ped-subtracted) ADC response

700 800 900 1000 1100 1200

Number of Events

0 20 40 60 80 100 120 140 160

LMS Distribution for id 1171 from run 05370 adcLMS2_1171 Entries 11 Mean 978.6 RMS 17.8